<script>
	export default {
    globalData: {
      baseUrl: 'https://tx.hz-hanghui.com:8088/hanghui-openapi', // 线上
      // baseUrl: 'http://192.168.77.9:8081/hanghui-server-platform', // 线下测试
    },
		onLaunch: function(options) {
			console.log('App Launch', options)
		},
		onShow: function(options) {
			console.log('App Show', options)
		},
		onHide: function() {
			console.log('App Hide')
		}
	}
</script>

<style>
	/*每个页面公共css */
</style>
